N.HEM LAT 20.000 TO 90.000 LON -180.000 TO 180.000

ANOMALY CORRELATION FORECAST

500hPa GEOPOTENTIAL

ECMWF FORECAST VERIFICATION 12UTC

Forecast Day MA = 12 Month Moving Average

1980

198119821983198419851986198719881989199019911992199319941995199619971998199920002001200220032004

4.5

5 5.5 6 6.5 7 7.5 8 8.5 9 9.5 10

SCORE REACHES 60.00

SCORE REACHES 60.00 MA